)^2c

) (GeV/ π (pK M 2.25 2.3 2.35

2c Entries / 4.0 MeV/

0.8

1.0

1.2

1.4

310 ×

2c 0.002 GeV/ ± = 2.291 μ , fixed to MC 2c = 0.007 GeV/ σ 99 ± ) = 539 σ3±S(

+ c.c., STD

+π^- pK → ^+_cΛ

= 7 TeV s ALICE pp,

)^2c

) (GeV/ S 0 (pK M 2.15 2.2 2.25 2.3 2.35 2.4

2c Entries / 8.0 MeV/

1.4

1.6

1.8

2.0 310 ×

2c 0.002 GeV/ ± = 2.284 μ , fixed to MC 2c = 0.009 GeV/ σ 89 ± ) = 414 σ3±S(

c < 4 GeV/ Tp 3 <

+ c.c., STD S 0 pK → ^+_cΛ